You may select any of these drivers for use with your graphics device
provided the driver is 100% compatible with the device. To select a graphics
device driver from the list, use the up and down arrow keys on the key pad
to highlight the desired driver, then press F1 to continue.

Be sure to select a driver that is supported by the PADS Program currently
being setup.  

Those graphics devices that have an *(asterisk) utilize the same driver.
The Orchid Pro Designer driver supports each of these graphics devices.
